<template>
    <Cn-page :loading='loading'>
        <view slot='body'>
            <view class='index'>
                <uni-list>
                    <uni-list-item v-for="item in 3" clickable @click="jump" :key="item" title="福州长乐变电站，测试监测点1发生稳态越限10次"
                        note="越限详情：3次谐波电压越限3次，5次谐波电压越限2次，电压总畸变率越限10次，电流畸变率8次，电流畸变率8次……" />
                </uni-list>
                <uni-load-more status="nomore"></uni-load-more>
            </view>
        </view>
    </Cn-page>
</template>
<script>
export default {
    data () {
        return {
            loading: false
        }
    },
    methods: {
        jump () {
            console.log(123);
            uni.navigateTo({
                url: '/pages/home/wentaiyuexianjiancedianDetail'
            })
        }
    }
}
</script>
<style lang='scss'>
.index {}
</style>