<template>
    <Rc-page :loading='loading'>
        <view slot='body'>
            <view class='wentaiyuexianDetail'>
                <view class="title">福州长乐变电站，测试监测点1发生稳态越限10次</view>
                <view class="des">3次谐波电压越限3次，5次谐波电压越限2次，电压总畸变率越限10次，电流畸变率8次，电流畸变率8次……</view>
            </view>
        </view>
    </Rc-page>
</template>
<script>
export default {
    data () {
        return {
            loading: false
        }
    },
    methods: {
    }
}
</script>
<style lang='scss'>
.wentaiyuexianDetail {
    padding: 34rpx;
    box-sizing: border-box;

    .des {
        font-size: 28rpx;
        color: #111;
        margin-top: 20rpx;
    }

    .title {
        font-size: 32rpx;
        color: #111;
        font-weight: 700;
    }
}
</style>