<template>
    <Cn-page :loading='loading'>
        <view slot='body'>
            <view class='index'>
                <uni-list>
                    <uni-list-item v-for="item in 2" clickable @click="jump" :key="item"
                        title="测试监测点1于2019-07-01 10:11:12.885发生暂降事件，残余电压：89%，持续时间：0.67s"
                        note="台账信息：南京灿能数据中心供电公司，福州长乐变电站，IP（MAC）：192.168.1.125" />
                </uni-list>
                <uni-load-more status="nomore"></uni-load-more>
            </view>
        </view>
    </Cn-page>
</template>
<script>
export default {
    data () {
        return {
            loading: false
        }
    },
    methods: {
        jump () {
            console.log(123);
            uni.navigateTo({
                url: '/pages/home/zantaishijianDetail'
            })
        }
    }
}
</script>
<style lang='scss'>
.index {}
</style>