<template>
    <Cn-page :loading='loading'>
        <view slot='body'>
            <view class='detail'>
                <view class="detail-content ">
                    <!-- <view class="detail-content-title mb20">发生时间</view> -->
                    <view>2023-02-14</view>
                </view>
                <view class="detail-content ">
                    <view class="detail-content-title mb20">终端基础信息</view>
                    <view class="mb10">灿能园区，NPQS_681</view>
                    <view>网络参数：00-B7-8D-A8-00-D3</view>
                </view>
                <view class="detail-content ">
                    <view class="detail-content-title mb20">终端通讯信息</view>
                    <view class="mb10">NPQS_681通讯终端1次，具体如下所示</view>
                    <view>2023-02-14 10:59:10至2023-02-14 10:59:57</view>
                </view>
                <view class="detail-content ">
                    <view class="detail-content-title mb20">终端告警信息</view>
                    <view class="mb10">暂无告警信息</view>
                </view>
                <view class="detail-content ">
                    <view class="detail-content-title mb20">终端流量信息</view>
                    <view class="mb10">NPQS_681的流量于2023-02-14 23:59:59占总流量的0.0%</view>
                </view>

            </view>
        </view>
    </Cn-page>
</template>
<script>
export default {
    data () {
        return {
            loading: false
        }
    },
    methods: {
    }
}
</script>
<style lang='scss'>
.detail {
    padding: 20rpx 0;

    .detail-content {
        padding: 20rpx;
        background: #fff;
        margin-bottom: 20rpx;
        font-size: 26rpx;

        .detail-content-title {
            font-size: 32rpx;
            color: #111;
            font-weight: 700;
        }
    }
}
</style>