<template>
    <div>
        <!--监测点列表 -->

        <Table ref="tableRef" @cell-click="cellClickEvent" :height="`calc(${prop.height}  )`"></Table>
        <!-- 指标越限详情 -->
        <OverLimitDetails ref="OverLimitDetailsRef" />
    </div>
</template>
<script setup lang="ts">
import { ref, onMounted, provide, reactive, watch, h } from 'vue'
import TableStore from '@/utils/tableStore'
import Table from '@/components/table/index.vue'
import TableHeader from '@/components/table/header/index.vue'
import { useDictData } from '@/stores/dictData'
import { ElMessage, ElMessageBox } from 'element-plus'
import { getTimeOfTheMonth } from '@/utils/formatTime'
import { ElTag } from 'element-plus'
import OverLimitDetails from '@/components/cockpit/listOfMainMonitoringPoints/components/overLimitDetails.vue'
const prop = defineProps({
    width: { type: String },
    height: { type: String },
    timeKey: { type: String },
    timeValue: { type: Object }
})
const dictData = useDictData()
const OverLimitDetailsRef = ref()
const tableStore: any = new TableStore({
    url: '/user-boot/role/selectRoleDetail?id=0',
    method: 'POST',

    showPage: false,
    exportName: '主要监测点列表',
    column: [
        {
            field: 'index',
            title: '序号',
            width: '80',
            formatter: (row: any) => {
                return (tableStore.table.params.pageNum - 1) * tableStore.table.params.pageSize + row.rowIndex + 1
            }
        },
        {
            title: '治理对象名称',
            field: 'name',
            minWidth: '80'
        },

        {
            title: '电压等级',
            field: 'type',
            minWidth: '70'
        },
        {
            title: '治理设备详情',
            field: 'type1',
            minWidth: '70'
        },

        {
            title: '治理前报告',
            field: 'type2',
            minWidth: '80',
            render: 'customTemplate',
            customTemplate: (row: any) => {
                 return `<span style='cursor: pointer;text-decoration: underline;' onclick="handleReportClick('${row.name}')">${row.type2}</span>`
            },
        },
        { title: '监测点名称', field: 'type3', minWidth: '70' },
        { title: '监测类型', field: 'type4', minWidth: '60' },
        {
            title: '监测点状态',
            field: 'type5',
            minWidth: '60',
            render: 'customTemplate',
            customTemplate: (row: any) => {
                return `<span style='color: ${row.type5 === '中断' ? '#FF0000' : ''}'>${row.type5}</span>`
            }
        },
        { title: '最新数据时间', field: 'type6', minWidth: '140' }
    ],
    beforeSearchFun: () => {
        tableStore.table.params.searchBeginTime = prop.timeValue?.[0] || getTimeOfTheMonth(prop.timeKey)[0]
        tableStore.table.params.searchEndTime = prop.timeValue?.[1] || getTimeOfTheMonth(prop.timeKey)[1]
    },
    loadCallback: () => {
        tableStore.table.data = [
            {
                name: '1#变压器',
                type: '0.38kV',
                type1: '250A APF',
                type2: '报告.doc',
                type3: '1#变压器 电网侧',
                type4: '电网侧',
                type5: '运行',
                type6: '2025-04-11 18:16:00'
            },
            {
                name: '1#变压器',
                type: '0.38kV',
                type1: '250A APF',
                type2: '报告.doc',
                type3: '1#变压器 负载侧',
                type4: '负载侧',
                type5: '运行',
                type6: '2025-04-11 18:16:00'
            },
            {
                name: '2#变压器',
                type: '0.38kV',
                type1: '100A SVG',
                type2: '/',
                type3: '1#变压器 电网侧',
                type4: '电网侧',
                type5: '运行',
                type6: '2025-04-11 18:16:00'
            },
            {
                name: '2#变压器',
                type: '0.38kV',
                type1: '100A SVG',
                type2: '/',
                type3: '1#变压器 负载侧',
                type4: '负载侧',
                type5: '中断',
                type6: '2025-04-11 18:16:00'
            }
        ]

        tableStore.table.height = `calc(${prop.height} - 80px)`
    }
})

const tableRef = ref()
provide('tableRef', tableRef)
tableStore.table.params.type = ''
tableStore.table.params.searchValue = ''
provide('tableStore', tableStore)

// 点击行
const cellClickEvent = ({ row, column }: any) => {
    if (column.field == 'name') {
        console.log(row)
        OverLimitDetailsRef.value.open(row)
    }
}

onMounted(() => {
    tableStore.index()
})
watch(
    () => prop.timeKey,
    val => {
        tableStore.index()
    }
)
watch(
    () => prop.timeValue, // 监听的目标（函数形式避免直接传递 props 导致的警告）
    (newVal, oldVal) => {
        tableStore.index()
    },
    {
        deep: true // 若 timeValue 是对象/数组，需开启深度监听
    }
)

const handleReportClick = (id: string) => {
  const row = tableStore.table.data.find((item: any) => item.id === id)
  if (row && row.type2 !== '/') {
    // 示例：触发下载逻辑（根据你注释掉的代码）
    // getFileZip({ eventId: id }).then(res => {
    //   let blob = new Blob([res], { type: 'application/zip' })
    //   const url = window.URL.createObjectURL(blob)
    //   const link = document.createElement('a')
    //   link.href = url
    //   link.download = row.wavePath?.split('/')[2] || '报告文件.zip'
    //   link.click()
    // })
    console.log('点击了报告:', row.type2)
  } else {
    ElMessage.warning('暂无报告可下载')
  }
}

// 挂载到 window 供 HTML 调用
window.handleReportClick = handleReportClick

// 组件销毁时清理全局方法
onBeforeUnmount(() => {
  delete window.handleReportClick
})
</script>
<style lang="scss" scoped></style>
