<template>
    <div>

        <!--电网侧指标越限统计 -->
        <my-echart
            class="tall"
            :options="echartList"
            :style="{ width: prop.width, height: `calc(${prop.height} / 2 )` }"
        />
        <Table ref="tableRef" @cell-click="cellClickEvent" :height="`calc(${prop.height} / 2 )`" isGroup></Table>
        <!-- 指标越限详情 -->
        <OverLimitDetails ref="OverLimitDetailsRef" />
    </div>
</template>
<script setup lang="ts">
import { ref, onMounted, provide, reactive, watch, h } from 'vue'
import TableStore from '@/utils/tableStore'
import Table from '@/components/table/index.vue'
import MyEchart from '@/components/echarts/MyEchart.vue'
import { useDictData } from '@/stores/dictData'
import { ElMessage, ElMessageBox } from 'element-plus'
import { getTimeOfTheMonth } from '@/utils/formatTime'
import OverLimitDetails from '@/components/cockpit/listOfMainMonitoringPoints/components/overLimitDetails.vue'
const prop = defineProps({
    width: { type: String },
    height: { type: String },
    timeKey: { type: String },
    timeValue: { type: Object }
})
const echartList = ref({
    title: {
        text: '指标越限占比'
    },

    xAxis: {
        // name: '(区域)',
        data: ['闪变', '谐波电压', '谐波电流', '电压偏差', '三相不平衡']
    },

    yAxis: {
        name: '%', // 给X轴加单位
        interval: 20
    },
    grid: {
        left: '10px',
        right: '20px'
    },
    options: {
        series: [
            {
                //   name: '暂降次数',
                type: 'bar',
                name: '越限占比',
                data: [0, 45, 22, 0, 70],
                barMaxWidth: 30,

                // label: {
                //     show: true,
                //     position: 'top',
                //     textStyle: {
                //         //数值样式
                //         color: '#000'
                //     },
                //     fontSize: 12
                // }
            }
        ]
    }
})
const OverLimitDetailsRef = ref()
const tableStore: any = new TableStore({
    url: '/user-boot/dept/deptTree',
    method: 'POST',

    showPage: false,

    column: [
        {
            field: 'index',
            title: '序号',
            width: '60',
            formatter: (row: any) => {
                return (tableStore.table.params.pageNum - 1) * tableStore.table.params.pageSize + row.rowIndex + 1
            }
        },
        {
            title: '名称',
            field: 'name',
            minWidth: '90'
        },
        {
            title: '越限占比(%)',
            children: [
                {
                    title: '闪变',
                    field: 'type',
                    minWidth: '70',
                    render: 'customTemplate',
                    customTemplate: (row: any) => {
                        return `<span style='cursor: pointer;text-decoration: underline;'>${row.type}</span>`
                    }
                },
                {
                    title: '谐波电压',
                    field: 'type1',
                    minWidth: '80',
                    render: 'customTemplate',
                    customTemplate: (row: any) => {
                        return `<span style='cursor: pointer;text-decoration: underline;'>${row.type1}</span>`
                    }
                },
                {
                    title: '谐波电流',
                    field: 'type2',
                    minWidth: '80',
                    render: 'customTemplate',
                    customTemplate: (row: any) => {
                        return `<span style='cursor: pointer;text-decoration: underline;'>${row.type2}</span>`
                    }
                },
                {
                    title: '电压偏差',
                    field: 'type3',
                    minWidth: '80',
                    render: 'customTemplate',
                    customTemplate: (row: any) => {
                        return `<span style='cursor: pointer;text-decoration: underline;'>${row.type3}</span>`
                    }
                },
                {
                    title: '三相不平衡',
                    field: 'type4',
                    minWidth: '90',
                    render: 'customTemplate',
                    customTemplate: (row: any) => {
                        return `<span style='cursor: pointer;text-decoration: underline;'>${row.type4}</span>`
                    }
                }
            ]
        }
    ],
    beforeSearchFun: () => {
       tableStore.table.params.searchBeginTime = prop.timeValue?.[0] || getTimeOfTheMonth(prop.timeKey)[0]
        tableStore.table.params.searchEndTime = prop.timeValue?.[1] || getTimeOfTheMonth(prop.timeKey)[1]
    },
    loadCallback: () => {
        tableStore.table.data = [
            {
                name: '1#变压器电网侧',
                type: '0',
                type1: '45',
                type2: '22',
                type3: '0',
                type4: '70'
            }
        ]

        tableStore.table.height = `calc(${prop.height} - 80px)`
    }
})

const tableRef = ref()
provide('tableRef', tableRef)

provide('tableStore', tableStore)

// 点击行
const cellClickEvent = ({ row, column }: any) => {
    if (column.field != 'name') {
        console.log(row)
        OverLimitDetailsRef.value.open(row)
    }
}

onMounted(() => {
    tableStore.index()
})
watch(
    () => prop.timeKey,
    val => {
        tableStore.index()
    }
)
watch(
    () => prop.timeValue, // 监听的目标（函数形式避免直接传递 props 导致的警告）
    (newVal, oldVal) => {
        tableStore.index()
    },
    {
        deep: true // 若 timeValue 是对象/数组，需开启深度监听
    }
)

const addMenu = () => {}
</script>
<style lang="scss" scoped></style>
