<template>
    <div>
        <vxe-table
            border
            show-footer
            ref="tableRef"
            v-bind="defaultAttribute"
            height="70"
            align="center"
            stripe
            :loading="loading"
            :print-config="{}"
            :column-config="{ resizable: false, width: 90 }"
            :data="tableData"
            style="width: 100%; margin-top: 10px"
        >
            <div v-if="tableIndex == 0">
                <vxe-colgroup title="电压有效值(kV)">
                    <vxe-column field="a" title="AB相"></vxe-column>
                    <vxe-column field="b" title="BC相"></vxe-column>
                    <vxe-column field="c" title="CA相"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="电流有效值(A)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="B相"></vxe-column>
                    <vxe-column field="c" title="C相"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="基波电压幅值(kV)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="B相"></vxe-column>
                    <vxe-column field="c" title="C相"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="基波电压相位(°)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="B相"></vxe-column>
                    <vxe-column field="c" title="C相"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="基波电流幅值(A)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="B相"></vxe-column>
                    <vxe-column field="c" title="C相"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="基波电流相位(°)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="B相"></vxe-column>
                    <vxe-column field="c" title="C相"></vxe-column>
                </vxe-colgroup>
            </div>
            <div v-if="tableIndex == 1">
                <vxe-colgroup title="电压偏差(%)">
                    <vxe-column field="a" title="AB相"></vxe-column>
                    <vxe-column field="b" title="BC相"></vxe-column>
                    <vxe-column field="c" title="CA相"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="电压总谐波畸变率(%)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="BC相"></vxe-column>
                    <vxe-column field="c" title="CA相"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="电流总谐波畸变率(%)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="BC相"></vxe-column>
                    <vxe-column field="c" title="CA相"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="电压不平衡度(%)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="BC相"></vxe-column>
                    <vxe-column field="c" title="CA相"></vxe-column>
                </vxe-colgroup>
                <vxe-column field="a" width="170" title="电流不平衡度(%)"></vxe-column>
                <vxe-column field="b" width="170" title="频率(Hz)"></vxe-column>
                <vxe-column field="c" width="170" title="基波电流相位(°)"></vxe-column>
            </div>
            <div v-if="tableIndex == 2">
                <vxe-colgroup title="有功功率(kV)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="B相"></vxe-column>
                    <vxe-column field="c" title="C相"></vxe-column>
                    <vxe-column field="c" title="总有功功率"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="无功功率(kV)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="B相"></vxe-column>
                    <vxe-column field="c" title="C相"></vxe-column>
                    <vxe-column field="c" title="总无功功率"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="视在功率(kV)">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="B相"></vxe-column>
                    <vxe-column field="c" title="C相"></vxe-column>
                    <vxe-column field="c" title="总视在功率"></vxe-column>
                </vxe-colgroup>
                <vxe-colgroup title="功率因数">
                    <vxe-column field="a" title="A相"></vxe-column>
                    <vxe-column field="b" title="B相"></vxe-column>
                    <vxe-column field="c" title="C相"></vxe-column>
                    <vxe-column field="c" title="总功率因数"></vxe-column>
                </vxe-colgroup>
            </div>
        </vxe-table>
    </div>
</template>
<script lang="ts" setup>
import { ref, nextTick, onMounted } from 'vue'
import { defaultAttribute } from '@/components/table/defaultAttribute'
import { VxeTablePropTypes, VxeTableInstance, VxeToolbarInstance } from 'vxe-table'

interface RowVO {
    a: string
    b: string
    c: string
}

const loading = ref(false)
const tableData = ref<RowVO[]>([])

const tableRef = ref<VxeTableInstance<RowVO>>()
const toolbarRef = ref<VxeToolbarInstance>()

loading.value = true

nextTick(() => {
    // 将表格和工具栏进行关联
    const $table = tableRef.value
    const $toolbar = toolbarRef.value
    if ($table && $toolbar) {
        $table.connect($toolbar)
    }
})
onMounted(() => {
    loading.value = false
})
const tableIndex: any = ref(null)
const getTableData = (val: any, list: any) => {
    tableIndex.value = val
    tableData.value = list
    loading.value = false
}
defineExpose({ getTableData })
</script>

<style lang="scss" scoped>
// ::v-deep .vxe-table--empty-content{
// display: none !important;
// }
</style>
