<!--业务用户管理界面-->
<template>
    <div class="default-main">
        <TableHeader >
            <template v-slot:select>
                <el-form-item label="筛选数据">
                    <el-input v-model="tableStore.table.params.name" clearable placeholder="筛选数据" />
                </el-form-item>
            </template>
            <template v-slot:operation>
                <el-button type="primary" @click="exportEvent" class="ml10" icon="el-icon-Download">导出</el-button>
            </template>
        </TableHeader>
        <!--表格-->
        <Table ref="tableRef"></Table>
    </div>
</template>

<script setup lang="ts">
import { ElMessage } from 'element-plus'
import TableStore from '@/utils/tableStore'
import Table from '@/components/table/index.vue'
import TableHeader from '@/components/table/header/index.vue'
import { onMounted, provide, ref } from 'vue'
import { useDictData } from '@/stores/dictData'
import { pageTable } from '@/api/harmonic-boot/luckyexcel'

defineOptions({
    name: 'harmonic-boot/reate/word'
})
const dictData = useDictData()
//区域联级选择
const industry = dictData.getBasicData('Interference_Source')
//用户信息弹出框
const tableRef = ref()

const tableStore = new TableStore({
    url: '/process-boot/flowable/task/todoList',
    method: 'GET',
    column: [
        {
            title: '序号',
            width: 60,
            formatter: (row: any) => {
                return (tableStore.table.params.pageNum - 1) * tableStore.table.params.pageSize + row.rowIndex + 1
            }
        },
        { title: '变电站', field: 'subName', width: 200 },
        { title: '监测点名称', field: 'lineName', width: 200 },
        {
            title: '行业类型',
            field: 'businessType',
            formatter: (row: any) => {
                return industry.find((item: any) => item.id == row.cellValue)?.name || '/'
            }
        },
        {
            title: '分类等级',
            field: 'calssificationGrade',
            formatter: (row: any) => {
                return row.cellValue || '/'
            }
        },
        { title: '电压等级', field: 'voltageScale' },
        {
            title: '上级变电站',
            field: 'superiorsSubstation',
            formatter: (row: any) => {
                return row.cellValue || '/'
            }
        }
    ],
    beforeSearchFun: () => {
        tableStore.table.params.beginTime = tableStore.table.params.startTime
        tableStore.table.params.deptId = tableStore.table.params.deptIndex
    }
})

onMounted(() => {
    // 加载数据
    tableStore.index()
})
tableStore.table.params.name = ''
provide('tableStore', tableStore)
// 导出
const exportEvent = () => {
    let form = JSON.parse(JSON.stringify(tableStore.table.params))
    form.pageNum = 1
    form.pageSize = tableStore.table.total
    pageTable(form).then(res => {
        tableRef.value.getRef().exportData({
            filename: '合格率报告', // 文件名字
            sheetName: 'Sheet1',
            type: 'xlsx', //导出文件类型 xlsx 和 csv
            useStyle: true,
            data: res.data.records, // 数据源 // 过滤那个字段导出
            columnFilterMethod: function (column: any) {
                return !(column.$columnIndex === 0)
            }
        })
    })
}
</script>
