<template>
    <div>
        <TableHeader area ref="TableHeaderRef" showExport>
            <template #select>
                <el-form-item label="运行状态">
                    <el-select v-model="tableStore.table.params.runF" clearable placeholder="请选择运行状态">
                        <el-option
                            v-for="item in runFlagList"
                            :key="item.id"
                            :label="item.name"
                            :value="item.id"
                        ></el-option>
                    </el-select>
                </el-form-item>
                <el-form-item label="数据筛选">
                    <el-input
                        style="width: 240px"
                        placeholder="电站名称，终端编号，监测点名称、电压等级、终端厂家、干扰源类型"
                        v-model="tableStore.table.params.searchValue"
                        clearable
                         maxlength="32"
                         show-word-limit
                    ></el-input>
                </el-form-item>
                <el-form-item label="电压等级:">
                    <el-select
                        v-model="tableStore.table.params.scale"
                        filterable
                        multiple
                        collapse-tags
                        clearable
                        placeholder="请选择电压等级"
                        value-key="id"
                    >
                        <el-option
                            v-for="item in voltageleveloption"
                            :key="item.id"
                            :label="item.name"
                            :value="item"
                        ></el-option>
                    </el-select>
                </el-form-item>
                <el-form-item label="终端厂家:">
                    <el-select
                        v-model="tableStore.table.params.manufacturer"
                        filterable
                        multiple
                        collapse-tags
                        clearable
                        placeholder="请选择终端厂家"
                        value-key="id"
                    >
                        <el-option
                            v-for="item in terminaloption"
                            :key="item.id"
                            :label="item.name"
                            :value="item"
                        ></el-option>
                    </el-select>
                </el-form-item>
                <el-form-item label="干扰源类型:">
                    <el-select
                        v-model="tableStore.table.params.loadType"
                        filterable
                        multiple
                        collapse-tags
                        clearable
                        placeholder="请选择干扰源类型"
                        value-key="id"
                    >
                        <el-option
                            v-for="item in interfereoption"
                            :key="item.id"
                            :label="item.name"
                            :value="item"
                        ></el-option>
                    </el-select>
                </el-form-item>
            </template>

            <template #operation>
                <!-- <el-button icon="el-icon-Download" type="primary">导出</el-button> -->
            </template>
        </TableHeader>
        <Table ref="tableRef" />
    </div>
</template>
<script setup lang="ts">
import { ref, onMounted, provide, nextTick, watch } from 'vue'
import TableStore from '@/utils/tableStore'
import Table from '@/components/table/index.vue'
import TableHeader from '@/components/table/header/index.vue'
import { ElMessage, ElMessageBox } from 'element-plus'
import { mainHeight } from '@/utils/layout'
import { useDictData } from '@/stores/dictData'
import { addUse, updateUse, removeUse } from '@/api/advance-boot/bearingCapacity'

const dictData = useDictData()
const interferenceType = dictData.getBasicData('Interference_Source')
const istatusList = dictData.getBasicData('On-network_Status')
const TableHeaderRef = ref()
const areaOptionList = dictData.getBasicData('jibei_area')
const interfereoption = dictData.getBasicData('Interference_Source')
const terminaloption = dictData.getBasicData('Dev_Manufacturers')
const voltageleveloption = dictData.getBasicData('Dev_Voltage_Stand')
const tableStore = new TableStore({
    url: '/device-boot/runManage/getLineLedger',
    publicHeight: 65,
    isWebPaging: true,
    method: 'POST',
    filename: '监测点台账',
    column: [
        {
            title: '序号',
            width: 80,
            formatter: (row: any) => {
                return (tableStore.table.params.pageNum - 1) * tableStore.table.params.pageSize + row.rowIndex + 1
            }
        },

        {
            field: 'areaName',
            title: '省公司',
            minWidth: 100
        },

        { field: 'gdName', title: '市公司', minWidth: 150 },
        {
            field: 'bdName',
            title: '所属变电站',
            minWidth: 150
        },
        { field: 'lineName', title: '监测点名称', minWidth: 130 },
        { field: 'scale', title: '监测点电压等级', minWidth: 120 },

        { field: 'loadType', title: '干扰源类型', minWidth: 120 },
        {
            field: 'objName',
            title: '监测对象名称',
            minWidth: 180,
            formatter: (row: any) => {
                return row.cellValue ? row.cellValue : '/'
            }
        },
        {
            field: 'manufacturer',
            title: '终端厂家',
            minWidth: 100,
            formatter: (row: any) => {
                return row.cellValue ? row.cellValue : '/'
            }
        },
        { field: 'powerFlag', title: '用户性质', width: '120px' },
       
        /* { field: 'comFlag', title: '通讯状态 ', minWidth: 120 },*/
        { field: 'id', title: '监测点序号', minWidth: 90 },
        {
            field: 'runFlag',
            title: '运行状态',
            minWidth: 80,
            render: 'tag',
            custom: {
                投运: 'success',
                停运: 'danger',
                检修: 'warning',
                调试: 'warning',
                退运: 'danger'
            }
        },
        { field: 'devName', title: '监测终端编号 ', minWidth: 140 },
        { field: 'ptType', title: '监测终端接线方式', minWidth: 140 },
        {
            field: 'shortCapacity',
            title: '最小短路容量(MVA)',
            minWidth: 150
        },
        {
            field: 'devCapacity',
            title: '供电设备容量(MVA )',
            minWidth: 160
        },
        {
            field: 'dealCapacity',
            title: '用户协议容量(MVA)',
            minWidth: 150
        },
        {
            field: 'voltageDev',
            title: '电压偏差上限(%)',
            minWidth: 140
        },
        {
            field: 'uvoltageDev',
            title: '电压偏差下限(%)',
            minWidth: 140
        }

        /*   {
                title: '操作',fixed: 'right',
               minWidth: 150,
               fixed: 'right',
               render: 'buttons',
               buttons: [
                   {
                       name: 'productSetting',
                       title: '流程详情',
                       type: 'primary',
                       icon: 'el-icon-EditPen',
                       render: 'basicButton',
                       click: row => {

                       }
                   }
               ]
           }*/
    ],

    beforeSearchFun: () => {
        tableStore.table.params.serverName = 'harmonic-boot'

        tableStore.table.params.runFlag = []
        if (tableStore.table.params.runF != null) {
            tableStore.table.params.runFlag = [tableStore.table.params.runF]
        }
        tableStore.table.params.comFlag = [0, 1]
        tableStore.table.params.statisticalType = {
            name: '电网拓扑',
            code: 'Power_Network'
        }
    }
})

tableStore.table.params.runF = 0
tableStore.table.params.runFlag = []
tableStore.table.params.searchValue = ''
tableStore.table.params.scale = []
tableStore.table.params.manufacturer = []
tableStore.table.params.loadType = []
const runFlagList = [
    { id: 0, name: '投运' },
    { id: 1, name: '检修' },
    { id: 2, name: '停运' },
    { id: 3, name: '调试' },
    { id: 4, name: '退运' }
]

provide('tableStore', tableStore)
onMounted(() => {
    tableStore.index()
})
const setSearchValue = (val: string) => {
    tableStore.table.params.searchValue = val
    tableStore.index()
}
const setSearchType = async (val: string, key: string) => {
    tableStore.table.params.searchValue = ''
    tableStore.table.params.scale = []
    tableStore.table.params.manufacturer = []
    tableStore.table.params.loadType = []
    if (key == 'Voltage_Level') {
        // 电压等级
        tableStore.table.params.scale = await getType(voltageleveloption, val)
    } else if (key == 'Manufacturer') {
        // 终端厂家
        tableStore.table.params.manufacturer = await getType(terminaloption, val)
    } else if (key == 'Load_Type') {
        // 干扰源类型
        tableStore.table.params.loadType = await getType(interfereoption, val)
    }

    await tableStore.index()
}
const getType = (list: any, str: string) => {
    if (str == '其他') {
        return list.filter(
            (item: any) =>
                item.name != '风电场' &&
                item.name != '光伏电站' &&
                item.name != '电气化铁路' &&
                item.name != '一类变电站' &&
                item.name != '安徽振兴' &&
                item.name != '南京灿能' &&
                item.name != '深圳中电' &&
                item.name != '东方威思顿' &&
                item.name != '220kV' &&
                item.name != '110kV' &&
                item.name != '35kV' &&
                item.name != '500kV'
        )
    } else {
        return list.filter((item: any) => item.name == str)
    }
}
defineExpose({
    setSearchValue,
    setSearchType
})
</script>
