<template>
    <div class="default-main">
        <el-descriptions :column="2" border>
            <el-descriptions-item label="填报人">
                {{ detailData.reporter }}
            </el-descriptions-item>
            <el-descriptions-item label="填报日期">
                {{ formatDate(detailData.reportDate, 'YYYY-MM-DD') }}
            </el-descriptions-item>
            <el-descriptions-item label="填报部门">
                {{ detailData.orgName }}
            </el-descriptions-item>
            <el-descriptions-item label="工程预期投产日期">
                {{ formatDate(detailData.expectedProductionDate, 'YYYY-MM-DD') }}
            </el-descriptions-item>
            <el-descriptions-item label="用户性质">
                {{
                    userTypeList.find(item => {
                        return item.value == detailData.userType
                    })?.label
                }}
            </el-descriptions-item>
            <el-descriptions-item label="所在地市">
                {{ detailData.city }}
            </el-descriptions-item>
            <el-descriptions-item label="归口管理部门">
                {{ detailData.responsibleDepartment }}
            </el-descriptions-item>
            <el-descriptions-item label="用户状态">
                {{
                    userStateList.find(item => {
                        return item.value == detailData.userStatus
                    })?.label
                }}
            </el-descriptions-item>
            <el-descriptions-item label="变电站">
                {{ detailData.substation }}
            </el-descriptions-item>
            <el-descriptions-item label="工程名">
                {{ detailData.projectName }}
            </el-descriptions-item>
            <el-descriptions-item label="电压等级">
                {{
                    voltageLevelList.find(item => {
                        return item.id == detailData.voltageLevel
                    })?.name
                }}
            </el-descriptions-item>
            <el-descriptions-item label="非线性终端类型" v-if="detailData.userType == 0 || detailData.userType == 1">
                {{ proviteData.nonlinearDeviceType ? proviteData.nonlinearDeviceType : '-' }}
            </el-descriptions-item>
            <el-descriptions-item label="预测评估单位">
                {{ detailData.evaluationDept }}
            </el-descriptions-item>
            <el-descriptions-item label="预测评估结论" :span="2">
                {{ detailData.evaluationConclusion }}
            </el-descriptions-item>
            <el-descriptions-item
                 :label="detailData.userType == '4'?'非线性设备类型: ':'非线性负荷类型：'"
                v-if="
                    detailData.userType == '2' ||
                    detailData.userType == '3' ||
                    detailData.userType == '4' ||
                    detailData.userType == '5'
                "
            >
                {{ proviteData.nonlinearLoadType }}
            </el-descriptions-item>
            <el-descriptions-item label="是否需要治理">
                <span v-if="detailData.userType == 0 || detailData.userType == 1">
                    {{ proviteData.needGovernance == 0 ? '否' : '是' }}
                </span>
                <span
                    v-if="
                        detailData.userType == 2 ||
                        detailData.userType == 3 ||
                        detailData.userType == 4 ||
                        detailData.userType == 5
                    "
                >
                    {{ proviteData.needGovernance == 0 ? '否' : '是' }}
                </span>
                <span v-if="detailData.userType == 6">{{ proviteData.needGovernance == 0 ? '否' : '是' }}</span>
            </el-descriptions-item>
            <el-descriptions-item label="是否开展背景测试">
                <span v-if="detailData.userType == 0 || detailData.userType == 1">
                    {{ proviteData.backgroundTestPerformed == 0 ? '否' : '是' }}
                </span>
                <span
                    v-if="
                        detailData.userType == 2 ||
                        detailData.userType == 3 ||
                        detailData.userType == 4 ||
                        detailData.userType == 5
                    "
                >
                    {{ proviteData.backgroundTestPerformed == 0 ? '否' : '是' }}
                </span>
                <span v-if="detailData.userType == 6">
                    {{ proviteData.backgroundTestPerformed == 0 ? '否' : '是' }}
                </span>
            </el-descriptions-item>
            <el-descriptions-item label="是否开展抗扰度测试" v-if="detailData.userType == 6">
                <span>
                    {{ proviteData.antiInterferenceTest == 0 ? '否' : '是' }}
                </span>
            </el-descriptions-item>
            <el-descriptions-item
                label="用户协议容量（MVA）"
                v-if="detailData.userType == 0 || detailData.userType == 1"
            >
                {{ proviteData.agreementCapacity }}
            </el-descriptions-item>
            <el-descriptions-item
                label="PCC供电终端容量（MVA）"
                v-if="
                    detailData.userType == '2' ||
                    detailData.userType == '3' ||
                    detailData.userType == '4' ||
                    detailData.userType == '5'
                "
            >
                {{ proviteData.pccEquipmentCapacity }}
            </el-descriptions-item>
            <el-descriptions-item
                label="基准短路容量（MVA）"
                v-if="
                    detailData.userType == '2' ||
                    detailData.userType == '3' ||
                    detailData.userType == '4' ||
                    detailData.userType == '5'
                "
            >
                {{ proviteData.baseShortCircuitCapacity }}
            </el-descriptions-item>
            <el-descriptions-item
                label="系统最小短路容量（MVA）"
                v-if="
                    detailData.userType == '2' ||
                    detailData.userType == '3' ||
                    detailData.userType == '4' ||
                    detailData.userType == '5'
                "
            >
                {{ proviteData?.minShortCircuitCapacity }}
            </el-descriptions-item>
            <el-descriptions-item
                label="用户用电协议容量（MVA）"
                v-if="
                    detailData.userType == '2' ||
                    detailData.userType == '3' ||
                    detailData.userType == '4' ||
                    detailData.userType == '5'
                "
            >
                {{ proviteData?.userAgreementCapacity }}
            </el-descriptions-item>
            <el-descriptions-item label="PCC点" v-if="detailData.userType != 0 && detailData.userType != 1">
                {{ proviteData?.pccPoint }}
            </el-descriptions-item>
            <el-descriptions-item label="评估类型" v-if="detailData.userType != 0 && detailData.userType != 1">
                {{
                    evaluationTypeList.find(item => {
                        return item.id == proviteData?.evaluationType
                    })?.name
                }}
            </el-descriptions-item>
            <el-descriptions-item label="预测评估评审单位" v-if="detailData.userType != 0 && detailData.userType != 1">
                {{ proviteData?.evaluationChekDept }}
            </el-descriptions-item>
            <el-descriptions-item label="行业" v-if="detailData.userType == 6">
                {{
                    industryList.find(item => {
                        return item.id == proviteData.industry
                    })?.name
                }}
            </el-descriptions-item>
            <el-descriptions-item label="敏感终端名称" v-if="detailData.userType == 6">
                {{ proviteData.deviceName }}
            </el-descriptions-item>
            <!--            <el-descriptions-item label="供电电源数量" v-if="detailData.userType == 6">-->
            <!--                {{ proviteData.powerSupplyCount }}-->
            <!--            </el-descriptions-item>-->
            <el-descriptions-item label="供电电源情况" v-if="detailData.userType == 6">
                {{
                    powerSupplyInfoOptionList.find(item => {
                        return item.id == proviteData.powerSupplyInfo
                    })?.name
                }}
            </el-descriptions-item>
            <el-descriptions-item label="供电电源" :span="2" v-if="detailData.userType == 6">
                {{ proviteData.powerSupply }}
            </el-descriptions-item>
            <el-descriptions-item label="负荷级别" v-if="detailData.userType == 6">
                {{
                    loadLevelOptionList.find(item => {
                        return item.id == proviteData.loadLevel
                    })?.name
                }}
            </el-descriptions-item>
            <el-descriptions-item label="敏感电能质量指标" v-if="detailData.userType == 6">
                {{
                    energyQualityIndexList.find(item => {
                        return item.id == proviteData.energyQualityIndex
                    })?.name
                }}
            </el-descriptions-item>
            <el-descriptions-item label="可研报告">
                <span v-if="detailData.userType == 0 || detailData.userType == 1">
                    <el-icon class="elView" v-if="proviteData?.feasibilityReport?.name">
                        <View @click="openFile(proviteData?.feasibilityReport?.name)" />
                    </el-icon>
                    <a target="_blank" :href="proviteData.feasibilityReport?.url" rel="nofollow">
                        {{ proviteData.feasibilityReport?.name }}
                    </a>
                </span>
                <span
                    v-if="
                        detailData.userType == 2 ||
                        detailData.userType == 3 ||
                        detailData.userType == 4 ||
                        detailData.userType == 5
                    "
                >
                    <el-icon class="elView" v-if="proviteData?.feasibilityReport?.name">
                        <View @click="openFile(proviteData?.feasibilityReport?.name)" />
                    </el-icon>
                    <a target="_blank" :href="proviteData.feasibilityReport?.url">
                        {{ proviteData.feasibilityReport?.name }}
                    </a>
                </span>
                <span v-if="detailData.userType == 6">
                    <el-icon class="elView" v-if="proviteData?.feasibilityReport?.name">
                        <View @click="openFile(proviteData?.feasibilityReport?.name)" />
                    </el-icon>
                    <a target="_blank" :href="proviteData.feasibilityReport?.url">
                        {{ proviteData.feasibilityReport?.name }}
                    </a>
                </span>
            </el-descriptions-item>
            <el-descriptions-item label="项目初步设计说明书">
                <el-icon class="elView" v-if="proviteData?.preliminaryDesignDescription?.name">
                    <View @click="openFile(proviteData?.preliminaryDesignDescription?.name)" />
                </el-icon>

                <a target="_blank" :href="proviteData?.preliminaryDesignDescription?.url">
                    {{ proviteData?.preliminaryDesignDescription?.name }}
                </a>
            </el-descriptions-item>
            <el-descriptions-item label="预测评估报告">
                <el-icon class="elView" v-if="proviteData?.predictionEvaluationReport?.name">
                    <View @click="openFile(proviteData?.predictionEvaluationReport?.name)" />
                </el-icon>
                <a target="_blank" :href="proviteData?.predictionEvaluationReport?.url">
                    {{ proviteData?.predictionEvaluationReport?.name }}
                </a>
            </el-descriptions-item>
            <el-descriptions-item label="预测评估评审意见报告">
                <el-icon class="elView" v-if="proviteData?.predictionEvaluationReviewOpinions?.name">
                    <View @click="openFile(proviteData?.predictionEvaluationReviewOpinions?.name)" />
                </el-icon>
                <a target="_blank" :href="proviteData?.predictionEvaluationReviewOpinions?.url">
                    {{ proviteData?.predictionEvaluationReviewOpinions?.name }}
                </a>
            </el-descriptions-item>
            <el-descriptions-item
                label="用户接入变电站主接线示意图"
                v-if="detailData.userType != 0 && detailData.userType != 1"
            >
                <el-icon class="elView" v-if="proviteData?.substationMainWiringDiagram?.name">
                    <View @click="openFile(proviteData?.substationMainWiringDiagram?.name)" />
                </el-icon>
                <a target="_blank" :href="proviteData?.substationMainWiringDiagram?.url">
                    {{ proviteData?.substationMainWiringDiagram?.name }}
                </a>
            </el-descriptions-item>
            <el-descriptions-item label="主要敏感终端清单" v-if="detailData.userType == 6">
                <el-icon class="elView" v-if="proviteData?.sensitiveDevices?.name">
                    <View @click="openFile(proviteData?.sensitiveDevices?.name)" />
                </el-icon>
                <a target="_blank" :href="proviteData?.sensitiveDevices?.url">
                    {{ proviteData?.sensitiveDevices?.name }}
                </a>
            </el-descriptions-item>
            <el-descriptions-item label="抗扰度测试报告" v-if="detailData.userType == 6">
                <el-icon class="elView" v-if="proviteData?.antiInterferenceReport?.name">
                    <View @click="openFile(proviteData?.antiInterferenceReport?.name)" />
                </el-icon>
                <a target="_blank" :href="proviteData?.antiInterferenceReport?.url">
                    {{ proviteData?.antiInterferenceReport?.name }}
                </a>
            </el-descriptions-item>
            <el-descriptions-item label="背景电能质量测试报告" v-if="detailData.userType == 6">
                <el-icon class="elView" v-if="proviteData?.powerQualityReport?.name">
                    <View @click="openFile(proviteData?.powerQualityReport?.name)" />
                </el-icon>
                <a target="_blank" :href="proviteData?.powerQualityReport?.url">
                    {{ proviteData?.powerQualityReport?.name }}
                </a>
            </el-descriptions-item>
            <el-descriptions-item
                label="其他附件"
                v-if="proviteData?.additionalAttachments && proviteData?.additionalAttachments?.url"
            >
                <el-icon class="elView" v-if="proviteData?.additionalAttachments?.name">
                    <View @click="openFile(proviteData?.additionalAttachments?.name)" />
                </el-icon>
                <a target="_blank" :href="proviteData?.additionalAttachments?.url">
                    {{ proviteData?.additionalAttachments?.name }}
                </a>
            </el-descriptions-item>

            <el-descriptions-item label="入网评估报告">
                <div v-for="item in netInReportList">
                    <el-icon class="elView" v-if="item.name">
                        <View @click="openFile(item.name)" />
                    </el-icon>
                    <a target="_blank" :href="item.url">
                        {{ item.name }}
                    </a>
                </div>
            </el-descriptions-item>
            <el-descriptions-item label="治理评估报告">
                <div v-for="item in governReportList">
                    <el-icon class="elView" v-if="item.name">
                        <View @click="openFile(item.name)" />
                    </el-icon>
                    <a target="_blank" :href="item.url">
                        {{ item.name }}
                    </a>
                </div>
            </el-descriptions-item>
        </el-descriptions>
    </div>
</template>
<script lang="ts" setup>
import { onMounted, ref, reactive, watch } from 'vue'
import { useRoute, useRouter } from 'vue-router'
import { formatDate } from '@/utils/formatTime'
import { propTypes } from '@/utils/propTypes'
import { getUserReportById, getUserReportUpdateById } from '@/api/supervision-boot/userReport/form'
import { getDictTreeById } from '@/api/system-boot/dictTree'
import { useDictData } from '@/stores/dictData'
import { getFileNameAndFilePath } from '@/api/system-boot/file'
import { Link, View } from '@element-plus/icons-vue'
import PreviewFile from '@/components/PreviewFile/index.vue'
defineOptions({ name: 'BpmUserReportDetail' })

const { query } = useRoute() // 查询参数

const props = defineProps({
    id: propTypes.string.def(undefined),
    update: {
        type: Boolean,
        default: false
    }
})
const detailLoading = ref(false) // 表单的加载中
const detailData = ref<any>({}) // 详情数据
const queryId = query.id as unknown as string // 从 URL 传递过来的 id 编号
const openFile = (name: any) => {
    window.open(window.location.origin + '/#/previewFile?' + name)
}
const netInReportList: any = ref([])
const governReportList: any = ref([])
//用户性质数组
const userTypeList = reactive([
    {
        label: '新建电网工程',
        value: '0'
    },
    {
        label: '扩建电网工程',
        value: '1'
    },
    {
        label: '新建非线性负荷用户',
        value: '2'
    },
    {
        label: '扩建非线性负荷用户',
        value: '3'
    },
    {
        label: '新建新能源发电站',
        value: '4'
    },
    {
        label: '扩建新能源发电站',
        value: '5'
    },
    {
        label: '敏感及重要用户',
        value: '6'
    }
])
//用户状态数组
const userStateList = reactive([
    {
        label: '可研',
        value: '0'
    },
    {
        label: '建设',
        value: '1'
    },
    {
        label: '运行',
        value: '2'
    },
    {
        label: '退运',
        value: '3'
    }
])
const dictData = useDictData()
//字典获取所在地市
const areaOptionList = dictData.getBasicData('jibei_area')
//字典获取敏感电能质量指标
const energyQualityIndexList = dictData.getBasicData('Indicator_Type')
//字典获取行业类型
const industryList = dictData.getBasicData('industry_type_jb')
//字典电压等级
const voltageLevelList = dictData.getBasicData('Dev_Voltage_Stand')
//字典评估类型
const evaluationTypeList = dictData.getBasicData('Evaluation_Type')
//字典预测评估单位
const evaluationDeptList = dictData.getBasicData('evaluation_dept')
const loadLevelOptionList = dictData.getBasicData('load_level')
const powerSupplyInfoOptionList = dictData.getBasicData('supply_condition')
/** 获得数据 */
const getInfo = async () => {
    detailLoading.value = true
    try {
        if (props.update) {
            await getUserReportUpdateById(props.id || queryId).then(res => {
                detailData.value = res.data.userReportMessageJson
                getProviteData()
            })
        } else {
            await getUserReportById(props.id || queryId).then(res => {
                detailData.value = res.data
                getProviteData()
            })
        }
    } finally {
        detailLoading.value = false
    }
}
const proviteData = ref()
//可研报告
const feasibilityReportRef: any = ref(null)
//项目初步设计说明书
const preliminaryDesignDescriptionRef: any = ref(null)
//预测评估报告
const predictionEvaluationReportRef: any = ref(null)
//预测评估评审意见报告
const predictionEvaluationReviewOpinionsRef: any = ref(null)
//用户接入变电站主接线示意图
const substationMainWiringDiagramRef: any = ref(null)
//主要敏感终端清单
const sensitiveDevicesRef: any = ref(null)
//抗扰度测试报告
const antiInterferenceReportRef: any = ref(null)
//背景电能质量测试报告
const powerQualityReportRef: any = ref(null)
//其他附件
const additionalAttachmentsRef: any = ref(null)
//预览
const preview = (val: any, url: any) => {
    nextTick(() => {
        //可研报告
        if (val == 'feasibilityReport') {
            feasibilityReportRef?.value.open(url)
        }
        //项目初步设计说明书
        if (val == 'preliminaryDesignDescription') {
            preliminaryDesignDescriptionRef?.value.open(url)
        }
        //预测评估报告
        if (val == 'predictionEvaluationReport') {
            console.log(url, '9999999')
            predictionEvaluationReportRef?.value.open(url)
        }
        //预测评估评审意见报告
        if (val == 'predictionEvaluationReviewOpinions') {
            predictionEvaluationReviewOpinionsRef?.value.open(url)
        }
        //用户接入变电站主接线示意图
        if (val == 'substationMainWiringDiagram') {
            substationMainWiringDiagramRef?.value.open(url)
        }
        //主要敏感终端清单
        if (val == 'sensitiveDevices') {
            sensitiveDevicesRef?.value.open(url)
        }
        //抗扰度测试报告
        if (val == 'antiInterferenceReport') {
            antiInterferenceReportRef?.value.open(url)
        }
        //背景电能质量测试报告
        if (val == 'powerQualityReport') {
            powerQualityReportRef?.value.open(url)
        }
        //其他附件
        if (val == 'additionalAttachments') {
            additionalAttachmentsRef?.value.open(url)
        }
    })
}
//判断userType选择取用的对象
const getProviteData = async () => {
    if (detailData.value.userType == '0' || detailData.value.userType == '1') {
        proviteData.value = detailData.value.userReportProjectPO
        //查询非线性终端类型
        await getDictTreeById(proviteData.value.nonlinearDeviceType).then(res => {
            proviteData.value.nonlinearDeviceType = res.data?.name
        })
    } else if (
        detailData.value.userType == '2' ||
        detailData.value.userType == '3' ||
        detailData.value.userType == '4' ||
        detailData.value.userType == '5'
    ) {
        proviteData.value = detailData.value.userReportSubstationPO
        //查询非线性负荷类型
        await getDictTreeById(proviteData.value.nonlinearLoadType).then(res => {
            proviteData.value.nonlinearLoadType = res.data?.name
        })
    } else {
        proviteData.value = detailData.value.userReportSensitivePO
    }
    //可研报告
    if (proviteData.value.feasibilityReport) {
        await getFileNamePath(proviteData.value.feasibilityReport, 'feasibilityReport')
    }
    //项目初步设计说明书
    if (proviteData.value.preliminaryDesignDescription) {
        await getFileNamePath(proviteData.value.preliminaryDesignDescription, 'preliminaryDesignDescription')
    }
    //预测评估报告
    if (proviteData.value.predictionEvaluationReport) {
        await getFileNamePath(proviteData.value.predictionEvaluationReport, 'predictionEvaluationReport')
    }

    //预测评估评审意见报告
    if (proviteData.value.predictionEvaluationReviewOpinions) {
        await getFileNamePath(
            proviteData.value.predictionEvaluationReviewOpinions,
            'predictionEvaluationReviewOpinions'
        )
    }
    //用户接入变电站主接线示意图
    if (proviteData.value.substationMainWiringDiagram) {
        await getFileNamePath(proviteData.value.substationMainWiringDiagram, 'substationMainWiringDiagram')
    }

    //主要敏感终端清单
    if (proviteData.value.sensitiveDevices) {
        await getFileNamePath(proviteData.value.sensitiveDevices, 'sensitiveDevices')
    }

    //抗扰度测试报告
    if (proviteData.value.antiInterferenceReport) {
        await getFileNamePath(proviteData.value.antiInterferenceReport, 'antiInterferenceReport')
    }

    //背景电能质量测试报告
    if (proviteData.value.powerQualityReport) {
        await getFileNamePath(proviteData.value.powerQualityReport, 'powerQualityReport')
    }

    //其他附件
    if (proviteData.value.additionalAttachments) {
        getFileNamePath(proviteData.value.additionalAttachments, 'additionalAttachments')
    }

    // 入网评估报告
    if (detailData.value.netInReport.length > 0) {
        netInReportList.value = []
        detailData.value.netInReport.forEach((item: any) => {
            if (item != null) {
                getFileNamePath(item, 'netInReport')
            }
        })
    }
    // 治理评估告"
    if (detailData.value.governReport.length > 0) {
        governReportList.value = []
        detailData.value.governReport.forEach((item: any) => {
            if (item != null) {
                getFileNamePath(item, 'governReport')
            }
        })
    }
}
//根据文件名请求
const getFileNamePath = async (val: any, pathName: any) => {
    await getFileNameAndFilePath({ filePath: val }).then(res => {
        if (res.data && res.data.name && res.data.url) {
            //可研报告
            if (pathName == 'feasibilityReport' && proviteData.value.feasibilityReport) {
                proviteData.value.feasibilityReport = {
                    name: res.data.fileName,
                    url: res.data.url
                }
            }
            //项目初步设计说明书
            else if (pathName == 'preliminaryDesignDescription' && proviteData.value.preliminaryDesignDescription) {
                proviteData.value.preliminaryDesignDescription = {
                    name: res.data.fileName,
                    url: res.data.url
                }
            }
            //预测评估报告
            else if (pathName == 'predictionEvaluationReport' && proviteData.value.predictionEvaluationReport) {
                proviteData.value.predictionEvaluationReport = {
                    name: res.data.fileName,
                    url: res.data.url
                }
            }
            //预测评估评审意见报告
            else if (
                pathName == 'predictionEvaluationReviewOpinions' &&
                proviteData.value.predictionEvaluationReviewOpinions
            ) {
                proviteData.value.predictionEvaluationReviewOpinions = {
                    name: res.data.fileName,
                    url: res.data.url
                }
            }
            //用户接入变电站主接线示意图
            else if (pathName == 'substationMainWiringDiagram' && proviteData.value.substationMainWiringDiagram) {
                proviteData.value.substationMainWiringDiagram = {
                    name: res.data.fileName,
                    url: res.data.url
                }
            }
            //主要敏感终端清单
            else if (pathName == 'sensitiveDevices' && proviteData.value.sensitiveDevices) {
                proviteData.value.sensitiveDevices = {
                    name: res.data.fileName,
                    url: res.data.url
                }
            }
            //抗扰度测试报告
            else if (pathName == 'antiInterferenceReport' && proviteData.value.antiInterferenceReport) {
                proviteData.value.antiInterferenceReport = {
                    name: res.data.fileName,
                    url: res.data.url
                }
            }
            //背景电能质量测试报告
            else if (pathName == 'powerQualityReport' && proviteData.value.powerQualityReport) {
                proviteData.value.powerQualityReport = {
                    name: res.data.fileName,
                    url: res.data.url
                }
            }
            //其他附件
            else if (pathName == 'additionalAttachments' && proviteData.value.additionalAttachments) {
                proviteData.value.additionalAttachments = {
                    name: res.data.fileName,
                    url: res.data.url
                }
            }

            if (pathName == 'netInReport') {
                netInReportList.value.push({
                    name: res.data.fileName,
                    url: res.data.url
                })
            } else if (pathName == 'governReport') {
                governReportList.value.push({
                    name: res.data.fileName,
                    url: res.data.url
                })
            }
        }
    })
}
defineExpose({ open: getInfo }) // 提供 open 方法，用于打开弹窗

watch(
    () => props.id,
    (val, oldVal) => {
        val && getInfo()
    }
)
/** 初始化 **/
onMounted(() => {
    getInfo()
})
</script>
<style lang="scss">
::v-deep.el-icon svg {
    // margin: 5px !important;
    // position: absolute !important;
    // top: 20px !important;
    // float: right;
}
// .el-icon {
//     float: left;
// }
// a {
//     display: block;
//     width: 200px;
//     float: right;
// }
.elView {
    cursor: pointer;
    margin-right: 10px;
}
</style>
