<template>
    <div class="default-main">
        <el-tabs v-model="activeName" type="border-card">
            <el-tab-pane label="未建档非线性用户录入及查询" name="1">
                <undocumented v-if="activeName == '1'"/>
            </el-tab-pane>
            <el-tab-pane label="入网评估报告审核" name="2"><network  v-if="activeName == '2'"/></el-tab-pane>
            <el-tab-pane label="干扰源用户常态化管理" name="3"><normal  v-if="activeName == '3'"/></el-tab-pane>
            <el-tab-pane label="实测报告审核" name="4"><report  v-if="activeName == '4'"/></el-tab-pane>
        </el-tabs>
    </div>
</template>

<script setup lang="ts">
import { onMounted, reactive, ref, provide } from 'vue'
import undocumented from './components/undocumented.vue'
import network from './components/network.vue'
import normal from './components/normal.vue'
import report from './components/report.vue'

import { mainHeight } from '@/utils/layout'
defineOptions({
    name: 'Processsupervision/interferencemanagement'
})
const activeName = ref('1')
const Statistics = ref()
const compatibility = ref()

const layout = mainHeight(63) as any
</script>

<style lang="scss" scoped>
.bars_w {
    width: 100%;
    height: 500px;
}
:deep(.el-tabs__content) {
    height: v-bind('layout.height');
    overflow-y: auto;
}
</style>
