<!---试运行列表-->
<template>
    <div>
    <TableHeader area datePicker ref="TableHeaderRef">

        <template #operation>
             <el-button icon="el-icon-Plus" type="primary" @click="startRunTest">试运行</el-button>
        </template>
    </TableHeader>
    <Table ref="tableRef" />
    </div>
</template>
<script setup lang="ts">
import { ref, onMounted, provide, nextTick } from 'vue'
import TableStore from '@/utils/tableStore'
import Table from '@/components/table/index.vue'
import TableHeader from '@/components/table/header/index.vue'
import { useRouter } from 'vue-router'
import { useDictData } from '@/stores/dictData'
import { ElMessage } from 'element-plus'


const dictData = useDictData()
const { push } = useRouter()

const TableHeaderRef = ref()
const tableRef = ref()

const tableStore = new TableStore({
    url: '/supervision-boot/tempLinedebug/pageHasDebug',
    method: 'POST',
    column: [
        { title: '', type: 'checkbox', width: 80 },
        { field: 'lineName', title: '监测点名称', minWidth: 170 },
        { field: 'connectedBus', title: '接入母线', minWidth: 170 },
        { field: 'monitoringTerminalCode', title: '终端编号', minWidth: 170 },
        { field: 'monitoringTerminalName', title: '终端名称', minWidth: 170 },
        { field: 'powerSubstationName', title: '变电站', minWidth: 170 },
        { field: 'reason', title: '调试原因', minWidth: 170 },
        {
            field: 'testRunState',
            title: '试运行状态',
            minWidth: 100,
            render: 'tag',
            custom: {
                0: 'primary',
                2: 'success',
                3: 'danger',
                1: 'warning'
            },
            replaceValue: {
                0: '待试运行',
                1: '试运行中',
                2: '试运行成功',
                3: '试运行失败',
                null:'待试运行'
            }
        },
        {
            field: 'status',
            title: '审核状态',
            minWidth: 100,
            render: 'tag',
            custom: {
                1: 'primary',
                2: 'success',
                3: 'danger',
                4: 'warning'
            },
            replaceValue: {
                1: '审批中',
                2: '审批通过',
                3: '审批不通过',
                4: '已取消',
                null:'/'
            }
        },
        {
            title: '操作',
            minWidth: 200,
            fixed: 'right',
            render: 'buttons',
            buttons: [
                {

                    name: 'productSetting',
                    title: '流程详情',
                    type: 'primary',
                    icon: 'el-icon-EditPen',
                    render: 'basicButton',
                    click: row => {
                        handleAudit(row.processInstanceId)
                    },
                    disabled: row => {
                        return !row.processInstanceId;
                    }
                },

            ]
        }
    ],

    beforeSearchFun: () => {
        tableStore.table.params.orgNo = tableStore.table.params.deptIndex
        tableStore.table.params.statveList = [2]
        // tableStore.table.params.relationUserName = tableStore.table.params.userName
    }
})



provide('tableStore', tableStore)


onMounted(() => {
    tableStore.index()
})

/** 处理审批按钮 */
const handleAudit = (instanceId: any) => {
    push({
        name: 'BpmProcessInstanceDetail',
        query: {
            id: instanceId
        }
    })
}
//试运行
const startRunTest = () => {
    let monitorIds: any = []
    tableStore.table.selection.forEach(item => {
        if(item.testRunState != 0){
            return ElMessage({
                message: '请选择未试运行的监测点进行试运行',
                type: 'warning'
            })
            return false;
        }

        if (item.testRunState == 0) {
            monitorIds.push(item.id)
        }
    })
}
</script>

<style scoped lang="scss">

</style>
