<template>
    <div class="default-main">
        <el-tabs v-model="activeName" type="border-card">
            <el-tab-pane label="干扰源用户建档管理" name="1">
                <undocumented v-if="activeName == '1'" />
            </el-tab-pane>
            <!--            <el-tab-pane label="入网评估报告审核" name="2"><network v-if="activeName == '2'" /></el-tab-pane>-->
            <el-tab-pane label="常态化干扰源用户管理" name="3">
                <interferenceUserTable v-if="activeName == '3'" />
            </el-tab-pane>
            <!--            <el-tab-pane label="实测报告审核" name="4"><report v-if="activeName == '4'" /></el-tab-pane>-->
            <!-- <el-tab-pane label="终端入网检测" name="5">
              <terminalNetworkDetection v-if="activeName == '5'"></terminalNetworkDetection>
            </el-tab-pane> -->
        </el-tabs>
    </div>
</template>

<script setup lang="ts">
import { onMounted, reactive, ref, provide } from 'vue'
import { mainHeight } from '@/utils/layout'
import undocumented from './components/undocumented/index.vue'
import interferenceUserTable from './components/normalizationManager/interferenceUserTable.vue'

defineOptions({
    name: 'supervision/interferencemanagement'
})
const activeName = ref('1')


const layout = mainHeight(63) as any
</script>

<style lang="scss" scoped>
.bars_w {
    width: 100%;
    height: 500px;
}
:deep(.el-tabs__content) {
    height: v-bind('layout.height');
    overflow-y: auto;
}
</style>
