<template>
    <div>
        <TableHeader area ref="TableHeaderRef">
            <template #select>
                <el-form-item label='运行状态'>
                    <el-select v-model="tableStore.table.params.runF" clearable placeholder="请选择运行状态">
                        <el-option
                            v-for="item in runFlagList"
                            :key="item.id"
                            :label="item.name"
                            :value="item.id"
                        ></el-option>
                    </el-select>
                </el-form-item>
                <el-form-item label="信息查询">
                    <el-input  style="width:210px;" placeholder="电站名称，装置编号，监测点名称" v-model="tableStore.table.params.searchValue" clearable></el-input>
                </el-form-item>

            </template>

            <template #operation>
                <!-- <el-button icon="el-icon-Download" type="primary">导出</el-button> -->
            </template>
        </TableHeader>
        <Table ref="tableRef" />
    </div>
</template>
<script setup lang="ts">
import { ref, onMounted, provide, nextTick } from 'vue'
import TableStore from '@/utils/tableStore'
import Table from '@/components/table/index.vue'
import TableHeader from '@/components/table/header/index.vue'
import { ElMessage, ElMessageBox } from 'element-plus'
import { mainHeight } from '@/utils/layout'
import { useDictData } from '@/stores/dictData'
import { addUse, updateUse, removeUse } from '@/api/advance-boot/bearingCapacity'

const dictData = useDictData()
const interferenceType = dictData.getBasicData('Interference_Source')
const istatusList = dictData.getBasicData('On-network_Status')
const TableHeaderRef = ref()
const areaOptionList = dictData.getBasicData('jibei_area')
const tableStore = new TableStore({
    url: '/device-boot/runManage/getLineLedger',
    publicHeight: 65,
    isWebPaging: true,
    method: 'POST',
    column: [
        /* { title: '序号', type: 'seq', width: 80 },*/

        {
            field: 'areaName',
            title: '省公司',
            minWidth: 100
        },

        { field: 'gdName', title: '市公司', minWidth: 150 },
        {
            field: 'bdName',
            title: '所属变电站',
            minWidth: 150
        },
        { field: 'lineName', title: '监测点名称', minWidth: 130 },
        { field: 'scale', title: '监测点电压等级', minWidth: 120 },

        { field: 'loadType', title: '干扰源类型', minWidth: 120 },
        { field: 'objName', title: '监测对象名称', minWidth: 180 },
        {
            field: 'shortCapacity',
            title: '最小短路容量(MVA)',
            minWidth: 150
        },
        {
            field: 'devCapacity',
            title: '供电设备容量(MVA )',
            minWidth: 150
        },
        {
            field: 'dealCapacity',
            title: '用户协议容量(MVA)',
            minWidth: 150
        },
        /* { field: 'comFlag', title: '通讯状态 ', minWidth: 120 },*/
        { field: 'id', title: '监测点序号', minWidth: 90 },
        {
            field: 'runFlag',
            title: '运行状态',
            minWidth: 80,
            render: 'tag',
            custom: {
                '投运': 'success',
                '停运': 'danger',
                '检修': 'warning',
                '调试': 'warning',
                '退运': 'danger',

            },
        },
        { field: 'devName', title: '监测终端编号 ', minWidth: 140 },
        { field: 'ptType', title: '监测终端接线方式', minWidth: 140 },
        {
            field: 'voltageDev',
            title: '电压偏差上限(%)',
            minWidth: 120
        },
        {
            field: 'uvoltageDev',
            title: '电压偏差下限(%)',
            minWidth: 120
        },


        /*   {
               title: '操作',
               minWidth: 150,
               fixed: 'right',
               render: 'buttons',
               buttons: [
                   {
                       name: 'productSetting',
                       title: '流程详情',
                       type: 'primary',
                       icon: 'el-icon-EditPen',
                       render: 'basicButton',
                       click: row => {

                       }
                   }
               ]
           }*/
    ],

    beforeSearchFun: () => {
        tableStore.table.params.serverName = 'harmonic-boot'

        tableStore.table.params.runFlag = []
        if(tableStore.table.params.runF!=null){
            tableStore.table.params.runFlag = [tableStore.table.params.runF]
        }
        tableStore.table.params.comFlag = [0, 1]
        tableStore.table.params.statisticalType = {
            name: '电网拓扑',
            code: 'Power_Network'
        }
    }
})

tableStore.table.params.runF=null
tableStore.table.params.runFlag=[]
tableStore.table.params.searchValue=''


const runFlagList = [{id:0,name:'运行'},{id:1,name:'检修'},{id:2,name:'停运'},{id:3,name:'调试'},{id:4,name:'退运'}]

provide('tableStore', tableStore)
onMounted(() => {
    tableStore.index()
})
</script>
