<template>
    <div class="default-main">
        <el-tabs v-model="activeName" type="border-card">
            <el-tab-pane label="谐波阻抗数据库" name="1">
                <HarmonicImpedanceTable />
            </el-tab-pane>
            <el-tab-pane label="谐波源数据库" name="2">
                <HarmonicSourcesTable />
            </el-tab-pane>
        </el-tabs>
    </div>
</template>

<script setup lang="ts">
import { onMounted, reactive, ref, provide } from 'vue'

import { mainHeight } from '@/utils/layout'
import HarmonicSourcesTable from './components/harmonicSources.vue'
import HarmonicImpedanceTable from './components/harmonicImpedance.vue'
defineOptions({
    name: 'database/model'
})
const activeName = ref('1')

const layout = mainHeight(63) as any
</script>

<style lang="scss" scoped>
.bars_w {
    width: 100%;
    height: 500px;
}
:deep(.el-tabs__content) {
    height: v-bind('layout.height');
    overflow-y: auto;
}
</style>
